en	Synchronize workspace "{workspaceName}" with "{baseWorkspaceName}"

en	Workspace "{baseWorkspaceName}" has been modified. You need to synchronize your workspace "{workspaceName}" with it in order to see those changes and avoid conflicts. Do you wish to proceed?

en	No, cancel

en	Yes, synchronize now

en	Synchronizing workspace "{workspaceName}"...

en	Please wait, while workspace "{workspaceName}" is being synchronized with recent changes in workspace "{baseWorkspaceName}". This may take a while.

en	Conflicts between workspace "{workspaceName}" and "{baseWorkspaceName}"

en	Workspace "{baseWorkspaceName}" contains modifications that are in conflict with the changes in workspace "{workspaceName}".

en	Show information about {numberOfConflicts} conflict(s)

en	In order to proceed, you need to decide what to do with the conflicting changes:

en	Drop conflicting changes

en	This will save all non-conflicting changes, while every conflicting change will be lost.

en	Discard workspace "{workspaceName}"

en	This will discard all changes in your workspace, including those on other sites.

en	Cancel Synchronization

en	Accept choice and continue

en	Discard all changes in workspace "{workspaceName}"

en	You are about to discard all {numberOfChanges} change(s) in workspace "{workspaceName}". This includes all changes on other sites. Do you wish to proceed? Be careful: This cannot be undone!

en	No, cancel

en	Yes, discard everything

en	You are about to drop the following changes:

en	Do you wish to proceed? Be careful: This cannot be undone!

en	No, cancel

en	Yes, drop those changes

en	Drop conflicting changes in workspace "{workspaceName}"

en	"{label}" has been edited.

en	"{label}" has been created.

en	"{label}" has been deleted.

en	"{label}" has been moved.

en	"{label}" or one of its ancestor nodes has been deleted.

en	Affected Site

en	Affected Document

en	What was changed?

en	Why is there a conflict?

en	Unknown Node

en	Unknown Document

en	Unknown Site

en	Workspace "{workspaceName}" is up-to-date

en	Workspace "{workspaceName}" has been successfully synchronized with all recent changes in workspace "{baseWorkspaceName}".

en	OK

en	Workspace "{workspaceName}" could not be synchronized

en	Workspace "{workspaceName}" could not be synchronized with the recent changes in workspace "{baseWorkspaceName}".

en	Cancel

en	Try again